You may select any of these drivers for use with your laser printer provided
the driver is 100% compatible with the laser printer. To select a driver
from the list, use the up and down arrow keys on the key pad to highlight
the desired driver, then press F1 to continue.

The page width and length may be modified by the user.  Use the right and
left arrow keys to move to the desired column.  The values are expressed in
thousands of an inch.  For example, 8.0 inches would be entered as 8000.
